Pedestals Calib 8598.1

0

50

100

300 350 Hut 1.4.3

HI gain 284.5 LO gain 359.4

0

50

300 350 400 Hut 1.4.4

HI gain 352.5 LO gain 391.8

0 50 100

400 450 500 Hut 1.4.5

HI gain 462.2 LO gain 417.1

0 50 100

300 350 400 Hut 1.4.6

HI gain 373.9 LO gain 336.3

0 50 100

300 350 400 Hut 1.4.7

HI gain 385.3 LO gain 344.0

0

50

100

350 400 450 Hut 1.4.8

HI gain 391.3 LO gain 428.1

0

50

100

300 350 400 Hut 1.5.2

HI gain 366.4 LO gain 331.1

0 50 100

300 350 400 Hut 1.5.3

HI gain 315.1 LO gain 365.1

0 50 100

400 450 500 Hut 1.5.4

HI gain 455.9 LO gain 462.1

0

50

100

350 400 450 Hut 1.5.5

HI gain 387.1 LO gain 367.3

Pedestals Calib 8598.1

0 50 100

350 400 450 Hut 1.5.6

HI gain 436.8 LO gain 399.8

0

50

100

300 350 400 Hut 1.5.7

HI gain 305.3 LO gain 382.0

0

50

100

400 450 500 Hut 1.5.8

HI gain 422.3 LO gain 431.0

0

50

100

350 400 450 Hut 1.6.2

HI gain 331.8 LO gain 469.3

0

50

100

350 400 450 Hut 1.6.3

HI gain 376.0 LO gain 398.1

0

50

100

350 400 450 Hut 1.6.4

HI gain 434.5 LO gain 384.2

0

50

100

400 450 500 Hut 1.6.5

HI gain 481.2 LO gain 443.6

0

50

350 400 450 Hut 1.6.6

HI gain 397.8 LO gain 371.4

0

50

350 400 450 Hut 1.6.7

HI gain 447.6 LO gain 378.0

0 50 100

300 350 Hut 1.6.8

HI gain 315.5 LO gain 327.6

Pedestals Calib 8598.1

0

100

350 400 450 Hut 1.7.2

HI gain 394.9 LO gain 367.3

0

100

350 400 450 Hut 1.7.3

HI gain 407.5 LO gain 392.0

0 50 100

400 450 500 Hut 1.7.4

HI gain 395.3 LO gain 462.2

0

100

400 450 500 Hut 1.7.5

HI gain 454.9 LO gain 455.3

0

100

350 400 450 Hut 1.7.6

HI gain 442.8 LO gain 340.9

0

100

350 400 450 Hut 1.7.7

HI gain 399.0 LO gain 377.4

0 50 100

260 280 300 320 340 Hut 1.7.8

HI gain 287.5 LO gain 257.1

0

100

300 350 Hut 1.8.2

HI gain 318.6 LO gain 294.2

0 50 100

300 350 400 Hut 1.8.3

HI gain 391.9 LO gain 333.5

0 50 100

300 350 400 Hut 1.8.4

HI gain 390.9 LO gain 352.6

Pedestals Calib 8598.1

0 50 100

350 400 450 Hut 1.8.5

HI gain 398.3 LO gain 389.5

0 50 100

400 450 500 Hut 1.8.6

HI gain 427.6 LO gain 485.8

0

50

100

400 450 500 Hut 1.8.7

HI gain 405.5 LO gain 458.8

0

50

252 254 256 258 Hut 1.8.8

HI gain 367.9 LO gain 0.0

0

50

100

255 260 265 270 Hut 1.9.2

HI gain 390.2 LO gain 0.0

0 50 100

300 350 Hut 1.9.3

HI gain 375.4 LO gain 263.4

0

50

100

300 350 400 Hut 1.9.4

HI gain 403.8 LO gain 290.6

0 50 100

400 450 500 Hut 1.9.5

HI gain 459.6 LO gain 414.7

0

50

100

350 400 450 Hut 1.9.6

HI gain 439.6 LO gain 320.3

0 50 100

350 400 450 Hut 1.9.7

HI gain 416.2 LO gain 359.2

Pedestals Calib 8598.1

0

50

100

300 350 400 Hut 1.9.8

HI gain 405.4 LO gain 314.2

0 20 40

300 350 Hut 1.10.2

HI gain 366.9 LO gain 278.6

0

50

100

450 500 550 Hut 1.10.3

HI gain 536.1 LO gain 420.9

0

50

100

350 400 450 Hut 1.10.4

HI gain 418.0 LO gain 407.8

0

50

100

350 400 450

Hut 1.10.5

HI gain 449.8 LO gain 355.1

0

50

100

400 450 500 Hut 1.10.6

HI gain 466.1 LO gain 427.5

0

50

350 400 450 Hut 1.10.7

HI gain 477.6 LO gain 340.2

0

50

100

350 400 450 Hut 1.10.8

HI gain 383.6 LO gain 398.3

0

50

350 400 450 Hut 1.11.3

HI gain 405.7 LO gain 373.8

0 25 50

300 350 Hut 1.11.4

HI gain 339.0 LO gain 307.8

Pedestals Calib 8598.1

0

50

100

300 350 400

Hut 1.11.5

HI gain 341.6 LO gain 369.0

0

50

300 350 400 Hut 1.11.6

HI gain 342.9 LO gain 347.3

0

50

350 400 450 Hut 1.11.7

HI gain 382.6 LO gain 405.9

0

50

100

350 400 450 Hut 1.11.8

HI gain 421.4 LO gain 388.0

LP calibrations Calib 8598.1

0 50 100

0 1000 2000 3000 4000

Entries Mean RMS 800 2588. 3.528

Hut 1.4.3 TDC counts

Events

0 50 100

2550 2600 2650

Entries Mean RMS 800 2588. 3.528

Hut 1.4.3

Hut 1.4.3 TDC counts

Events

HImean = 736.8 LOmean = 696.9

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2489. 2.704

Hut 1.4.4 TDC counts

Events

0

100

2450 2500 2550

Entries Mean RMS 800 2489. 2.704

Hut 1.4.4

Hut 1.4.4 TDC counts

Events

HImean = 791.7 LOmean = 676.6

0

500

0 1000 2000 3000 4000

Entries Mean RMS 800 0.5000 0.0000E+00

Hut 1.4.5 TDC counts

Events

0

500

0 25 50 75 100

Entries Mean RMS 800 0.5000 0.0000E+00

Hut 1.4.5

Hut 1.4.5 TDC counts

Events

HImean = 599.3 LOmean = 498.0

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2465. 87.22

Hut 1.4.6 TDC counts

Events

0

100

2450 2500 2550

Entries Mean RMS 800 2465. 87.22

Hut 1.4.6

Hut 1.4.6 TDC counts

Events

HImean = 906.5 LOmean = 603.6

0

500

0 1000 2000 3000 4000

Entries Mean RMS 800 0.5000 0.0000E+00

Hut 1.4.7 TDC counts

Events

0

500

0 25 50 75 100

Entries Mean RMS 800 0.5000 0.0000E+00

Hut 1.4.7

Hut 1.4.7 TDC counts

Events

HImean = 383.9 LOmean = 347.5

LP calibrations Calib 8598.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2561. 1.975

Hut 1.4.8 TDC counts

Events

0

100

2550 2600 2650

Entries Mean RMS 800 2561. 1.975

Hut 1.4.8

Hut 1.4.8 TDC counts

Events

HImean = 1532.5 LOmean = 1274.9

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2535. 2.403

Hut 1.5.2 TDC counts

Events

0

100

2500 2550 2600

Entries Mean RMS 800 2535. 2.403

Hut 1.5.2

Hut 1.5.2 TDC counts

Events

HImean = 1055.8 LOmean = 888.7

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2542. 2.317

Hut 1.5.3 TDC counts

Events

0

100

2500 2550 2600

Entries Mean RMS 800 2542. 2.317

Hut 1.5.3

Hut 1.5.3 TDC counts

Events

HImean = 1075.6 LOmean = 742.2

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 2481. 91.88

Hut 1.5.4 TDC counts

Events

0

100

200

2450 2500 2550

Entries Mean RMS 800 2481. 91.88

Hut 1.5.4

Hut 1.5.4 TDC counts

Events

HImean = 1303.7 LOmean = 932.0

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2419. 2.364

Hut 1.5.5 TDC counts

Events

0

100

2400 2450 2500

Entries Mean RMS 800 2419. 2.364

Hut 1.5.5

Hut 1.5.5 TDC counts

Events

HImean = 947.6 LOmean = 779.9

LP calibrations Calib 8598.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2471. 2.538

Hut 1.5.6 TDC counts

Events

0

100

2450 2500 2550

Entries Mean RMS 800 2471. 2.538

Hut 1.5.6

Hut 1.5.6 TDC counts

Events

HImean = 1141.7 LOmean = 815.4

0 50 100

0 1000 2000 3000 4000

Entries Mean RMS 800 2438. 86.26

Hut 1.5.7 TDC counts

Events

0 50 100

2400 2450 2500

Entries Mean RMS 800 2438. 86.26

Hut 1.5.7

Hut 1.5.7 TDC counts

Events

HImean = 749.2 LOmean = 1029.0

0

200

0 1000 2000 3000 4000

Entries Mean RMS 800 2550. 1.866

Hut 1.5.8 TDC counts

Events

0

200

2500 2550 2600 2650

Entries Mean RMS 800 2550. 1.866

Hut 1.5.8

Hut 1.5.8 TDC counts

Events

HImean = 983.0 LOmean = 719.5

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 2504. 2.508

Hut 1.6.2 TDC counts

Events

0

100

200

2500 2550 2600

Entries Mean RMS 800 2504. 2.508

Hut 1.6.2

Hut 1.6.2 TDC counts

Events

HImean = 1013.8 LOmean = 878.9

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2556. 2.234

Hut 1.6.3 TDC counts

Events

0

100

2550 2600 2650

Entries Mean RMS 800 2556. 2.234

Hut 1.6.3

Hut 1.6.3 TDC counts

Events

HImean = 1002.4 LOmean = 778.6

LP calibrations Calib 8598.1

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 2518. 2.085

Hut 1.6.4 TDC counts

Events

0

100

200

2500 2550 2600

Entries Mean RMS 800 2518. 2.085

Hut 1.6.4

Hut 1.6.4 TDC counts

Events

HImean = 1163.3 LOmean = 949.4

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2475. 87.58

Hut 1.6.5 TDC counts

Events

0

100

2450 2500 2550

Entries Mean RMS 800 2475. 87.58

Hut 1.6.5

Hut 1.6.5 TDC counts

Events

HImean = 1335.8 LOmean = 933.3

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2614. 13.60

Hut 1.6.6 TDC counts

Events

0

100

2600 2650 2700

Entries Mean RMS 800 2614. 13.60

Hut 1.6.6

Hut 1.6.6 TDC counts

Events

HImean = 1161.9 LOmean = 822.5

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2542. 2.095

Hut 1.6.7 TDC counts

Events

0

100

2500 2550 2600

Entries Mean RMS 800 2542. 2.095

Hut 1.6.7

Hut 1.6.7 TDC counts

Events

HImean = 1325.2 LOmean = 821.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2367. 1.990

Hut 1.6.8 TDC counts

Events

0

100

2350 2400 2450

Entries Mean RMS 800 2367. 1.990

Hut 1.6.8

Hut 1.6.8 TDC counts

Events

HImean = 1233.0 LOmean = 858.4

LP calibrations Calib 8598.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2320. 2.748

Hut 1.7.2 TDC counts

Events

0

100

2300 2350 2400

Entries Mean RMS 800 2320. 2.748

Hut 1.7.2

Hut 1.7.2 TDC counts

Events

HImean = 941.5 LOmean = 640.9

0

50

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2361. 136.8

Hut 1.7.3 TDC counts

Events

0

50

100

2350 2400 2450

Entries Mean RMS 800 2361. 136.8

Hut 1.7.3

Hut 1.7.3 TDC counts

Events

HImean = 489.7 LOmean = 448.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2320. 2.645

Hut 1.7.4 TDC counts

Events

0

100

2300 2350 2400

Entries Mean RMS 800 2320. 2.645

Hut 1.7.4

Hut 1.7.4 TDC counts

Events

HImean = 886.2 LOmean = 725.1

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 2328. 1.869

Hut 1.7.5 TDC counts

Events

0

100

200

2300 2350 2400

Entries Mean RMS 800 2328. 1.869

Hut 1.7.5

Hut 1.7.5 TDC counts

Events

HImean = 1111.5 LOmean = 872.6

0 50 100

0 1000 2000 3000 4000

Entries Mean RMS 800 2274. 2.563

Hut 1.7.6 TDC counts

Events

0 50 100

2250 2300 2350

Entries Mean RMS 800 2274. 2.563

Hut 1.7.6

Hut 1.7.6 TDC counts

Events

HImean = 1232.0 LOmean = 753.4

LP calibrations Calib 8598.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2316. 2.054

Hut 1.7.7 TDC counts

Events

0

100

2300 2350 2400

Entries Mean RMS 800 2316. 2.054

Hut 1.7.7

Hut 1.7.7 TDC counts

Events

HImean = 1164.1 LOmean = 1470.5

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2424. 2.823

Hut 1.7.8 TDC counts

Events

0

100

2400 2450 2500

Entries Mean RMS 800 2424. 2.823

Hut 1.7.8

Hut 1.7.8 TDC counts

Events

HImean = 1247.5 LOmean = 1252.6

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2405. 2.602

Hut 1.8.2 TDC counts

Events

0

100

2400 2450 2500

Entries Mean RMS 800 2405. 2.602

Hut 1.8.2

Hut 1.8.2 TDC counts

Events

HImean = 1079.9 LOmean = 692.2

0 100 200

0 1000 2000 3000 4000

Entries Mean RMS 800 2437. 1.941

Hut 1.8.3 TDC counts

Events

0 100 200

2400 2450 2500

Entries Mean RMS 800 2437. 1.941

Hut 1.8.3

Hut 1.8.3 TDC counts

Events

HImean = 858.9 LOmean = 559.3

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2314. 2.171

Hut 1.8.4 TDC counts

Events

0

100

2300 2350 2400

Entries Mean RMS 800 2314. 2.171

Hut 1.8.4

Hut 1.8.4 TDC counts

Events

HImean = 1326.8 LOmean = 783.5

LP calibrations Calib 8598.1

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 2394. 2.001

Hut 1.8.5 TDC counts

Events

0

100

200

2350 2400 2450

Entries Mean RMS 800 2394. 2.001

Hut 1.8.5

Hut 1.8.5 TDC counts

Events

HImean = 1043.7 LOmean = 780.9

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2320. 2.221

Hut 1.8.6 TDC counts

Events

0

100

2300 2350 2400

Entries Mean RMS 800 2320. 2.221

Hut 1.8.6

Hut 1.8.6 TDC counts

Events

HImean = 1533.6 LOmean = 1099.2

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2438. 2.579

Hut 1.8.7 TDC counts

Events

0

100

2400 2450 2500

Entries Mean RMS 800 2438. 2.579

Hut 1.8.7

Hut 1.8.7 TDC counts

Events

HImean = 1090.2 LOmean = 712.2

0 50 100

0 1000 2000 3000 4000

Entries Mean RMS 800 2388. 2.615

Hut 1.8.8 TDC counts

Events

0 50 100

2350 2400 2450

Entries Mean RMS 800 2388. 2.615

Hut 1.8.8

Hut 1.8.8 TDC counts

Events

HImean = 1149.7 LOmean = 725.8

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2385. 2.426

Hut 1.9.2 TDC counts

Events

0

100

2350 2400 2450

Entries Mean RMS 800 2385. 2.426

Hut 1.9.2

Hut 1.9.2 TDC counts

Events

HImean = 922.0 LOmean = 574.3

LP calibrations Calib 8598.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2356. 2.607

Hut 1.9.3 TDC counts

Events

0

100

2350 2400 2450

Entries Mean RMS 800 2356. 2.607

Hut 1.9.3

Hut 1.9.3 TDC counts

Events

HImean = 1101.9 LOmean = 752.4

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2452. 2.155

Hut 1.9.4 TDC counts

Events

0

100

2450 2500 2550

Entries Mean RMS 800 2452. 2.155

Hut 1.9.4

Hut 1.9.4 TDC counts

Events

HImean = 911.7 LOmean = 566.7

0

200

0 1000 2000 3000 4000

Entries Mean RMS 800 2387. 2.153

Hut 1.9.5 TDC counts

Events

0

200

2350 2400 2450

Entries Mean RMS 800 2387. 2.153

Hut 1.9.5

Hut 1.9.5 TDC counts

Events

HImean = 1475.3 LOmean = 1204.9

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2424. 2.167

Hut 1.9.6 TDC counts

Events

0

100

2400 2450 2500

Entries Mean RMS 800 2424. 2.167

Hut 1.9.6

Hut 1.9.6 TDC counts

Events

HImean = 1229.2 LOmean = 868.5

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 2385. 1.825

Hut 1.9.7 TDC counts

Events

0

100

200

2350 2400 2450

Entries Mean RMS 800 2385. 1.825

Hut 1.9.7

Hut 1.9.7 TDC counts

Events

HImean = 1079.0 LOmean = 804.3

LP calibrations Calib 8598.1

0 100 200

0 1000 2000 3000 4000

Entries Mean RMS 800 2262. 2.106

Hut 1.9.8 TDC counts

Events

0 100 200

2250 2300 2350

Entries Mean RMS 800 2262. 2.106

Hut 1.9.8

Hut 1.9.8 TDC counts

Events

HImean = 1066.0 LOmean = 777.5

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2631. 2.296

Hut 1.10.2 TDC counts

Events

0

100

2600 2650 2700

Entries Mean RMS 800 2631. 2.296

Hut 1.10.2

Hut 1.10.2 TDC counts

Events

HImean = 931.6 LOmean = 1198.3

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2442. 2.157

Hut 1.10.3 TDC counts

Events

0

100

2400 2450 2500

Entries Mean RMS 800 2442. 2.157

Hut 1.10.3

Hut 1.10.3 TDC counts

Events

HImean = 1338.3 LOmean = 872.9

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2386. 2.473

Hut 1.10.4 TDC counts

Events

0

100

2350 2400 2450

Entries Mean RMS 800 2386. 2.473

Hut 1.10.4

Hut 1.10.4 TDC counts

Events

HImean = 1090.5 LOmean = 877.3

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 2401. 2.105

Hut 1.10.5 TDC counts

Events

0

100

200

2350 2400 2450 2500

Entries Mean RMS 800 2401. 2.105

Hut 1.10.5

Hut 1.10.5 TDC counts

Events

HImean = 1283.9 LOmean = 877.2

LP calibrations Calib 8598.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2397. 2.367

Hut 1.10.6 TDC counts

Events

0

100

2350 2400 2450

Entries Mean RMS 800 2397. 2.367

Hut 1.10.6

Hut 1.10.6 TDC counts

Events

HImean = 1378.1 LOmean = 1103.5

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2432. 2.447

Hut 1.10.7 TDC counts

Events

0

100

2400 2450 2500

Entries Mean RMS 800 2432. 2.447

Hut 1.10.7

Hut 1.10.7 TDC counts

Events

HImean = 1329.2 LOmean = 840.6

0 100 200

0 1000 2000 3000 4000

Entries Mean RMS 800 2445. 1.977

Hut 1.10.8 TDC counts

Events

0 100 200

2400 2450 2500

Entries Mean RMS 800 2445. 1.977

Hut 1.10.8

Hut 1.10.8 TDC counts

Events

HImean = 1009.6 LOmean = 849.9

0 25 50

0 1000 2000 3000 4000

Entries Mean RMS 800 2091. 29.46

Hut 1.11.3 TDC counts

Events

0 25 50

2050 2100 2150

Entries Mean RMS 800 2091. 29.46

Hut 1.11.3

Hut 1.11.3 TDC counts

Events

HImean = 1023.6 LOmean = 996.5

0 50 100

0 1000 2000 3000 4000

Entries Mean RMS 800 2640. 2.713

Hut 1.11.4 TDC counts

Events

0 50 100

2600 2650 2700

Entries Mean RMS 800 2640. 2.713

Hut 1.11.4

Hut 1.11.4 TDC counts

Events

HImean = 1175.3 LOmean = 864.5

LP calibrations Calib 8598.1

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2607. 2.281

Hut 1.11.5 TDC counts

Events

0

100

2600 2650 2700

Entries Mean RMS 800 2607. 2.281

Hut 1.11.5

Hut 1.11.5 TDC counts

Events

HImean = 1098.4 LOmean = 756.2

0

100

200

0 1000 2000 3000 4000

Entries Mean RMS 800 2259. 2.250

Hut 1.11.6 TDC counts

Events

0

100

200

2250 2300 2350

Entries Mean RMS 800 2259. 2.250

Hut 1.11.6

Hut 1.11.6 TDC counts

Events

HImean = 923.6 LOmean = 786.3

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2478. 2.253

Hut 1.11.7 TDC counts

Events

0

100

2450 2500 2550

Entries Mean RMS 800 2478. 2.253

Hut 1.11.7

Hut 1.11.7 TDC counts

Events

HImean = 1169.0 LOmean = 1051.3

0

100

0 1000 2000 3000 4000

Entries Mean RMS 800 2392. 2.172

Hut 1.11.8 TDC counts

Events

0

100

2350 2400 2450

Entries Mean RMS 800 2392. 2.172

Hut 1.11.8

Hut 1.11.8 TDC counts

Events

HImean = 1340.6 LOmean = 1096.6

TDC calibrations Calib 8598.1

0 2000

4000

10 20 30

35.34 / 12 P1 -1373. P2 168.2

icalid

(TDC counts)

Hut 1.4.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.4.3

Hut 1.4.3 icalid

Δfit (TDC counts)

0.148609 ns/TDCcount

0

2000

4000

10 20 30

6.619 / 13 P1 -1575. P2 167.6

icalid

(TDC counts)

Hut 1.4.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.4.4

Hut 1.4.4 icalid

Δfit (TDC counts)

0.149186 ns/TDCcount

0

2000

4000

10 20 30

6.378 / 13 P1 -1588. P2 167.6

icalid

(TDC counts)

Hut 1.4.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.4.5

Hut 1.4.5 icalid

Δfit (TDC counts)

0.149133 ns/TDCcount

0

2000

4000

10 20 30

15.04 / 13 P1 -1573. P2 167.8

icalid

(TDC counts)

Hut 1.4.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.4.6

Hut 1.4.6 icalid

Δfit (TDC counts)

0.148968 ns/TDCcount

0

2000

4000

10 20 30

3.840 / 13 P1 -1551. P2 167.5

icalid

(TDC counts)

Hut 1.4.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.4.7

Hut 1.4.7 icalid

Δfit (TDC counts)

0.149228 ns/TDCcount

TDC calibrations Calib 8598.1

0 2000

4000

10 20 30

56.83 / 13 P1 -1409. P2 168.3

icalid

(TDC counts)

Hut 1.4.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.4.8

Hut 1.4.8 icalid

Δfit (TDC counts)

0.148547 ns/TDCcount

0 2000

4000

10 20 30

35.80 / 13 P1 -1415. P2 168.2

icalid

(TDC counts)

Hut 1.5.2

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.5.2

Hut 1.5.2 icalid

Δfit (TDC counts)

0.148625 ns/TDCcount

0

2000

4000

10 20 30

15.26 / 13 P1 -1542. P2 167.6

icalid

(TDC counts)

Hut 1.5.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.5.3

Hut 1.5.3 icalid

Δfit (TDC counts)

0.149161 ns/TDCcount

0

2000

4000

10 20 30

5.149 / 13 P1 -1575. P2 167.8

icalid

(TDC counts)

Hut 1.5.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.5.4

Hut 1.5.4 icalid

Δfit (TDC counts)

0.14903 ns/TDCcount

0

2000

4000

10 20 30

4.213 / 13 P1 -1565. P2 167.7

icalid

(TDC counts)

Hut 1.5.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.5.5

Hut 1.5.5 icalid

Δfit (TDC counts)

0.149093 ns/TDCcount

TDC calibrations Calib 8598.1

0

2000

4000

10 20 30

6.780 / 13 P1 -1585. P2 167.7

icalid

(TDC counts)

Hut 1.5.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.5.6

Hut 1.5.6 icalid

Δfit (TDC counts)

0.149081 ns/TDCcount

0

2000

4000

10 20 30

29.93 / 13 P1 -1575. P2 167.8

icalid

(TDC counts)

Hut 1.5.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.5.7

Hut 1.5.7 icalid

Δfit (TDC counts)

0.148989 ns/TDCcount

0

2000

4000

10 20 30

9.774 / 13 P1 -1559. P2 167.8

icalid

(TDC counts)

Hut 1.5.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.5.8

Hut 1.5.8 icalid

Δfit (TDC counts)

0.149015 ns/TDCcount

0

2000

4000

10 20 30

28.51 / 13 P1 -1589. P2 168.0

icalid

(TDC counts)

Hut 1.6.2

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.6.2

Hut 1.6.2 icalid

Δfit (TDC counts)

0.148848 ns/TDCcount

0

2000

4000

10 20 30

21.32 / 13 P1 -1597. P2 168.0

icalid

(TDC counts)

Hut 1.6.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.6.3

Hut 1.6.3 icalid

Δfit (TDC counts)

0.148835 ns/TDCcount

TDC calibrations Calib 8598.1

0

2000

4000

10 20 30

68.67 / 13 P1 -1608. P2 168.2

icalid

(TDC counts)

Hut 1.6.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.6.4

Hut 1.6.4 icalid

Δfit (TDC counts)

0.148622 ns/TDCcount

0

2000

4000

10 20 30

7.472 / 13 P1 -1558. P2 167.8

icalid

(TDC counts)

Hut 1.6.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.6.5

Hut 1.6.5 icalid

Δfit (TDC counts)

0.149023 ns/TDCcount

0

2000

4000

10 20 30

7.231 / 13 P1 -1598. P2 167.7

icalid

(TDC counts)

Hut 1.6.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.6.6

Hut 1.6.6 icalid

Δfit (TDC counts)

0.149093 ns/TDCcount

0

2000

4000

10 20 30

7.982 / 13 P1 -1619. P2 167.8

icalid

(TDC counts)

Hut 1.6.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.6.7

Hut 1.6.7 icalid

Δfit (TDC counts)

0.148947 ns/TDCcount

0

2000

4000

10 20 30

4.429 / 13 P1 -1578. P2 167.6

icalid

(TDC counts)

Hut 1.6.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.6.8

Hut 1.6.8 icalid

Δfit (TDC counts)

0.149192 ns/TDCcount

TDC calibrations Calib 8598.1

0

2000

4000

10 20 30

13.00 / 13 P1 -1570. P2 167.9

icalid

(TDC counts)

Hut 1.7.2

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.7.2

Hut 1.7.2 icalid

Δfit (TDC counts)

0.148941 ns/TDCcount

0

2000

4000

10 20 30

27.75 / 13 P1 -1592. P2 168.1

icalid

(TDC counts)

Hut 1.7.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.7.3

Hut 1.7.3 icalid

Δfit (TDC counts)

0.148757 ns/TDCcount

0

2000

4000

10 20 30

23.54 / 13 P1 -1618. P2 168.1

icalid

(TDC counts)

Hut 1.7.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.7.4

Hut 1.7.4 icalid

Δfit (TDC counts)

0.148722 ns/TDCcount

0

2000

4000

10 20 30

5.798 / 13 P1 -1612. P2 167.7

icalid

(TDC counts)

Hut 1.7.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.7.5

Hut 1.7.5 icalid

Δfit (TDC counts)

0.149042 ns/TDCcount

0

2000

4000

10 20 30

3.052 / 13 P1 -1617. P2 167.6

icalid

(TDC counts)

Hut 1.7.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.7.6

Hut 1.7.6 icalid

Δfit (TDC counts)

0.149204 ns/TDCcount

TDC calibrations Calib 8598.1

0

2000

4000

10 20 30

9.119 / 13 P1 -1618. P2 168.1

icalid

(TDC counts)

Hut 1.7.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.7.7

Hut 1.7.7 icalid

Δfit (TDC counts)

0.148705 ns/TDCcount

0

2000

4000

10 20 30

58.39 / 13 P1 -1580. P2 168.2

icalid

(TDC counts)

Hut 1.7.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.7.8

Hut 1.7.8 icalid

Δfit (TDC counts)

0.148648 ns/TDCcount

0

2000

4000

10 20 30

35.51 / 13 P1 -1595. P2 168.0

icalid

(TDC counts)

Hut 1.8.2

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.8.2

Hut 1.8.2 icalid

Δfit (TDC counts)

0.148822 ns/TDCcount

0

2000

4000

10 20 30

19.11 / 13 P1 -1566. P2 167.9

icalid

(TDC counts)

Hut 1.8.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.8.3

Hut 1.8.3 icalid

Δfit (TDC counts)

0.148943 ns/TDCcount

0

2000

4000

10 20 30

5.331 / 13 P1 -1604. P2 168.5

icalid

(TDC counts)

Hut 1.8.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.8.4

Hut 1.8.4 icalid

Δfit (TDC counts)

0.148401 ns/TDCcount

TDC calibrations Calib 8598.1

0

2000

4000

10 20 30

29.37 / 13 P1 -1536. P2 166.8

icalid

(TDC counts)

Hut 1.8.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.8.5

Hut 1.8.5 icalid

Δfit (TDC counts)

0.149883 ns/TDCcount

0

2000

4000

10 20 30

5.932 / 13 P1 -1553. P2 167.6

icalid

(TDC counts)

Hut 1.8.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.8.6

Hut 1.8.6 icalid

Δfit (TDC counts)

0.149145 ns/TDCcount

0

2000

4000

10 20 30

6.246 / 13 P1 -1564. P2 167.6

icalid

(TDC counts)

Hut 1.8.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.8.7

Hut 1.8.7 icalid

Δfit (TDC counts)

0.149141 ns/TDCcount

0

2000

4000

10 20 30

6.086 / 13 P1 -1598. P2 167.7

icalid

(TDC counts)

Hut 1.8.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.8.8

Hut 1.8.8 icalid

Δfit (TDC counts)

0.149116 ns/TDCcount

0

2000

4000

10 20 30

9.109 / 13 P1 -1617. P2 167.7

icalid

(TDC counts)

Hut 1.9.2

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.9.2

Hut 1.9.2 icalid

Δfit (TDC counts)

0.149086 ns/TDCcount

TDC calibrations Calib 8598.1

0

2000

4000

10 20 30

4.245 / 13 P1 -1611. P2 167.5

icalid

(TDC counts)

Hut 1.9.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.9.3

Hut 1.9.3 icalid

Δfit (TDC counts)

0.149236 ns/TDCcount

0

2000

4000

10 20 30

6.558 / 13 P1 -1557. P2 167.7

icalid

(TDC counts)

Hut 1.9.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.9.4

Hut 1.9.4 icalid

Δfit (TDC counts)

0.149091 ns/TDCcount

0

2000

4000

10 20 30

11.02 / 13 P1 -1563. P2 167.7

icalid

(TDC counts)

Hut 1.9.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.9.5

Hut 1.9.5 icalid

Δfit (TDC counts)

0.14907 ns/TDCcount

0

2000

4000

10 20 30

7.595 / 13 P1 -1574. P2 167.7

icalid

(TDC counts)

Hut 1.9.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.9.6

Hut 1.9.6 icalid

Δfit (TDC counts)

0.14909 ns/TDCcount

0

2000

4000

10 20 30

4.773 / 13 P1 -1594. P2 167.5

icalid

(TDC counts)

Hut 1.9.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.9.7

Hut 1.9.7 icalid

Δfit (TDC counts)

0.149271 ns/TDCcount

TDC calibrations Calib 8598.1

0

2000

4000

10 20 30

3.252 / 13 P1 -1563. P2 167.7

icalid

(TDC counts)

Hut 1.9.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.9.8

Hut 1.9.8 icalid

Δfit (TDC counts)

0.149072 ns/TDCcount

0

2000

4000

10 20 30

44.23 / 13 P1 -1472. P2 167.8

icalid

(TDC counts)

Hut 1.10.2

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.10.2

Hut 1.10.2 icalid

Δfit (TDC counts)

0.148973 ns/TDCcount

0

2000

4000

10 20 30

4.236 / 13 P1 -1559. P2 167.6

icalid

(TDC counts)

Hut 1.10.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.10.3

Hut 1.10.3 icalid

Δfit (TDC counts)

0.149152 ns/TDCcount

0

2000

4000

10 20 30

6.077 / 13 P1 -1590. P2 167.7

icalid

(TDC counts)

Hut 1.10.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.10.4

Hut 1.10.4 icalid

Δfit (TDC counts)

0.149102 ns/TDCcount

0

2000

4000

10 20 30

16.34 / 13 P1 -1576. P2 167.3

icalid

(TDC counts)

Hut 1.10.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.10.5

Hut 1.10.5 icalid

Δfit (TDC counts)

0.149438 ns/TDCcount

TDC calibrations Calib 8598.1

0

2000

4000

10 20 30

7.149 / 13 P1 -1568. P2 167.7

icalid

(TDC counts)

Hut 1.10.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.10.6

Hut 1.10.6 icalid

Δfit (TDC counts)

0.149096 ns/TDCcount

0

2000

4000

10 20 30

4.981 / 13 P1 -1534. P2 167.7

icalid

(TDC counts)

Hut 1.10.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.10.7

Hut 1.10.7 icalid

Δfit (TDC counts)

0.14911 ns/TDCcount

0

2000

4000

10 20 30

37.73 / 12 P1 -1543. P2 168.2

icalid

(TDC counts)

Hut 1.10.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.10.8

Hut 1.10.8 icalid

Δfit (TDC counts)

0.14861 ns/TDCcount

0

2000

4000

10 20 30

95.93 / 13 P1 -1512. P2 168.3

icalid

(TDC counts)

Hut 1.11.3

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.11.3

Hut 1.11.3 icalid

Δfit (TDC counts)

0.148588 ns/TDCcount

0

2000

4000

10 20 30

27.29 / 12 P1 -1522. P2 168.0

icalid

(TDC counts)

Hut 1.11.4

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.11.4

Hut 1.11.4 icalid

Δfit (TDC counts)

0.14881 ns/TDCcount

TDC calibrations Calib 8598.1

0

2000

4000

10 20 30

23.09 / 12 P1 -1514. P2 167.6

icalid

(TDC counts)

Hut 1.11.5

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.11.5

Hut 1.11.5 icalid

Δfit (TDC counts)

0.149146 ns/TDCcount

0

2000

4000

10 20 30

15.71 / 13 P1 -1635. P2 167.9

icalid

(TDC counts)

Hut 1.11.6

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.11.6

Hut 1.11.6 icalid

Δfit (TDC counts)

0.148919 ns/TDCcount

0

2000

4000

10 20 30

18.92 / 13 P1 -1614. P2 167.9

icalid

(TDC counts)

Hut 1.11.7

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.11.7

Hut 1.11.7 icalid

Δfit (TDC counts)

0.148855 ns/TDCcount

0

2000

4000

10 20 30

5.060 / 13 P1 -1679. P2 167.9

icalid

(TDC counts)

Hut 1.11.8

Only fitted points shown -10

0

10

0 10 20 30 Hut 1.11.8

Hut 1.11.8 icalid

Δfit (TDC counts)

0.148874 ns/TDCcount